-- Revert mimas-qa:qa_2017-06-14_init from mysql

BEGIN;

DROP TABLE IF EXISTS `api_answer_image`;
DROP TABLE IF EXISTS `api_answerreply_vote`;
DROP TABLE IF EXISTS `api_answer_reply`;
DROP TABLE IF EXISTS `api_answer_top`;
DROP TABLE IF EXISTS `api_answer_vote`;
DROP TABLE IF EXISTS `api_overheadanswer`;
DROP TABLE IF EXISTS `api_user_question_answer`;
DROP TABLE IF EXISTS `api_overheadquestion`;
DROP TABLE IF EXISTS `api_question_image`;
DROP TABLE IF EXISTS `api_question_vote`;
DROP TABLE IF EXISTS `api_questiontag`;
DROP TABLE IF EXISTS `api_answer`;
DROP TABLE IF EXISTS `api_question`;

COMMIT;
